GE 400P, 405P, 600P, 605P, 625P Series Replacement Battery 2000mAh / 14.40Wh

GE 400P, 405P, 600P, 605P, 625P Series Replacement Battery 2000mAh / 14.40Wh

400P, 405P, 600P, 605P, 625P Battery Specification

Voltage: 7.2V

Capacity: 2000mAh / 14.40Wh

Type: Ni-MH

400P, 405P, 600P, 605P, 625P Fits Models

400P, 405P, 600P, 605P, 625P, COUGAR, COUGAR 400, COUGAR 400P, COUGAR 405P, COUGAR 6000P, COUGAR 600P, COUGAR 605P, COUGAR 625P, GP405STX, MBPA5C, Orca 5000, PANTHER 400, PANTHER 400P, PANTHER 405P, PANTHER 600, PANTHER 600P, PANTHER 605P, PANTHER 625P

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post GE 400P, 405P, 600P, 605P, 625P Series Replacement Battery 2000mAh / 14.40Wh first appeared on Batterytek USA.