Tait5000,5010,5015,5018,5020 Series Replacement Battery 2000mAh / 14.40Wh

Tait5000,5010,5015,5018,5020 Series Replacement Battery 2000mAh / 14.40Wh

5000,5010,5015,5018,5020 Battery Specification

Voltage: 7.2V

Capacity: 2000mAh / 14.40Wh

Type: Ni-MH

5000,5010,5015,5018,5020 Fits Models

5000, 5010, 5015, 5018, 5020, 5030, 5035, 5040, 5040 FMIS, 600P, 625P, COUGAR, COUGAR 400, Eclipse, Excel, ORCA 5000, ORCA 5010, Orca 5010 FMIS, ORCA 5015, ORCA 5018, Orca 5018 FMIS, ORCA 5020, Orca 5020 FMIS, ORCA 5030, Orca 5030 FMIS, ORCA 5035, Orca 5035 FMIS, ORCA 5040, Orca 5040 FMIS, ORCA ECLIPSE, Orca Elan, ORCA EXCEL, PANTHER 400P, PANTHER 405P, PANTHER 600P, PANTHER 605P, PANTHER 625P

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Tait5000,5010,5015,5018,5020 Series Replacement Battery 2000mAh / 14.40Wh first appeared on Batterytek USA.