i-Audio X5L 20GB Replacement Battery 1100mAh

i-Audio X5L 20GB Replacement Battery 1100mAh

i-Audio X5L 20GB Replacement Battery 1100mAh Battery Specification

Voltage: 3.7V

Capacity: 1100mAh

Type: Li-ion

i-Audio X5L 20GB Replacement Battery 1100mAh Fits Models

X5L 20GB

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post i-Audio X5L 20GB Replacement Battery 1100mAh first appeared on Batterytek USA.