Acterna Anritsu Lite3000(E), EXFO FTB-100, EXFO FTB-400, MTS-5000, MTS-5100e Series Replacement Battery 4000mAh / 43.20Wh

Acterna Anritsu Lite3000(E), EXFO FTB-100, EXFO FTB-400, MTS-5000, MTS-5100e Series Replacement Battery 4000mAh / 43.20Wh

Anritsu Lite3000(E), EXFO FTB-100, EXFO FTB-400, MTS-5000, MTS-5100e Battery Specification

Voltage: 10.8V

Capacity: 4000mAh / 43.20Wh

Type: Ni-MH

Anritsu Lite3000(E), EXFO FTB-100, EXFO FTB-400, MTS-5000, MTS-5100e Fits Models

Anritsu Lite3000(E), EXFO FTB-100, EXFO FTB-400, MTS-5000, MTS-5100e, OTDR E6000

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Acterna Anritsu Lite3000(E), EXFO FTB-100, EXFO FTB-400, MTS-5000, MTS-5100e Series Replacement Battery 4000mAh / 43.20Wh first appeared on Batterytek USA.