Maxon SL55, SP130, SP130U, SP130U2, SP130V2 Series Replacement Battery 1800mAh / 12.96Wh

Maxon SL55, SP130, SP130U, SP130U2, SP130V2 Series Replacement Battery 1800mAh / 12.96Wh

SL55, SP130, SP130U, SP130U2, SP130V2 Battery Specification

Voltage: 7.2V

Capacity: 1800mAh / 12.96Wh

Type: Ni-MH

SL55, SP130, SP130U, SP130U2, SP130V2 Fits Models

SL55, SP130, SP130U, SP130U2, SP130V2, SP132U2, SP140, SP140U, SP140U2, SP140V2, SP150

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Maxon SL55, SP130, SP130U, SP130U2, SP130V2 Series Replacement Battery 1800mAh / 12.96Wh first appeared on Batterytek USA.