Garmin 010-01188-02, 2689LMT, 2689LMT 6-inch, Nuvi 2639LMT Series Replacement Battery 1500mAh / 5.55Wh

Garmin 010-01188-02, 2689LMT, 2689LMT 6-inch, Nuvi 2639LMT Series Replacement Battery 1500mAh / 5.55Wh

010-01188-02, 2689LMT, 2689LMT 6-inch, Nuvi 2639LMT Battery Specification

Voltage: 3.7V

Capacity: 1500mAh / 5.55Wh

Type: Li-ion

010-01188-02, 2689LMT, 2689LMT 6-inch, Nuvi 2639LMT Fits Models

010-01188-02, 2689LMT, 2689LMT 6-inch, Nuvi 2639LMT, Nuvi 2639LMT 6-inch, Nuvi 2689LMT

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Garmin 010-01188-02, 2689LMT, 2689LMT 6-inch, Nuvi 2639LMT Series Replacement Battery 1500mAh / 5.55Wh first appeared on Batterytek USA.