Motorola AP10, AP50, CP10, CP50, HT10 Series Replacement Battery 1000mAh / 7.20Wh

Motorola AP10, AP50, CP10, CP50, HT10 Series Replacement Battery 1000mAh / 7.20Wh

AP10, AP50, CP10, CP50, HT10 Battery Specification

Voltage: 7.2V

Capacity: 1000mAh / 7.20Wh

Type: Ni-MH

AP10, AP50, CP10, CP50, HT10 Fits Models

AP10, AP50, CP10, CP50, HT10, MU11, MU11C, MU11CV, MU12, MU12C, MU12CV, MU21C, MU21CV, MU22CV, MU22CVS, MU24CV, MU24CVS, MU24CVST, MV11, MV11C, MV11CV, MV12, MV12CV, MV21C, MV21CV, MV22, MV22CV, MV24CVS, P10, P50, P50 Compact., P60, Pro 1150, PRS-102, Radius CP10, Radius CP50, Radius HT10, Radius P10, Radius P50, Radius P60, Radius SP10, Radius SP21, SP10, SP21, SP50, SP50 Compact, SP50+, Spirit HP50, SU210, SU22, SU220, SU22C, SV10, SV11, SV11D, SV12, SV21, SV22, SV22C, Talkabout Distance DPS, TS11

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Motorola AP10, AP50, CP10, CP50, HT10 Series Replacement Battery 1000mAh / 7.20Wh first appeared on Batterytek USA.