Typhoon MyGuide 3000, MyGuide 3010, MyGuide 3030, Series Replacement Battery 850mAh

Typhoon MyGuide 3000, MyGuide 3010, MyGuide 3030, Series Replacement Battery 850mAh

MyGuide 3000, MyGuide 3010, MyGuide 3030, Battery Specification

Voltage: 3.7V

Capacity: 850mAh

Type: Li-Polymer

MyGuide 3000, MyGuide 3010, MyGuide 3030, Fits Models

MyGuide 3000, MyGuide 3010, MyGuide 3030

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Typhoon MyGuide 3000, MyGuide 3010, MyGuide 3030, Series Replacement Battery 850mAh first appeared on Batterytek USA.