Garmin Nuvi 1400, Nuvi 1450, Nuvi 1450T, Nuvi 1490LMT Series Replacement Battery 1250mAh / 4.63Wh

Garmin Nuvi 1400, Nuvi 1450, Nuvi 1450T, Nuvi 1490LMT Series Replacement Battery 1250mAh / 4.63Wh

Nuvi 1400, Nuvi 1450, Nuvi 1450T, Nuvi 1490LMT Battery Specification

Voltage: 3.7V

Capacity: 1250mAh / 4.63Wh

Type: Li-Polymer

Nuvi 1400, Nuvi 1450, Nuvi 1450T, Nuvi 1490LMT Fits Models

Nuvi 1400, Nuvi 1450, Nuvi 1450T, Nuvi 1490LMT, Nuvi 1490T, Nuvi 1490T Pro

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Garmin Nuvi 1400, Nuvi 1450, Nuvi 1450T, Nuvi 1490LMT Series Replacement Battery 1250mAh / 4.63Wh first appeared on Batterytek USA.