Panasonic Flyer S X-C 26″ Replacement Battery 18000mAh / 453.60Wh

Panasonic Flyer S X-C 26″ Replacement Battery 18000mAh / 453.60Wh

Panasonic Flyer S X-C 26″ Replacement Battery 18000mAh / 453.60Wh Battery Specification

Voltage: 25.2V

Capacity: 18000mAh / 453.60Wh

Type: Li-ion

Panasonic Flyer S X-C 26″ Replacement Battery 18000mAh / 453.60Wh Fits Models

Flyer S X-C 26″

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Panasonic Flyer S X-C 26″ Replacement Battery 18000mAh / 453.60Wh first appeared on Batterytek USA.