Medsonic MSCPR-1A Series Replacement Battery 3400mAh / 37.74Wh

Medsonic MSCPR-1A Series Replacement Battery 3400mAh / 37.74Wh

MSCPR-1A Battery Specification

Voltage: 11.1V

Capacity: 3400mAh / 37.74Wh

Type: Li-ion

MSCPR-1A Fits Models

MSCPR-1A

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Medsonic MSCPR-1A Series Replacement Battery 3400mAh / 37.74Wh first appeared on Batterytek USA.