Samsung 305U1Z, N310, N310-13, N310-13GB Series Replacement Battery 6600mAh / 48.84Wh

Samsung 305U1Z, N310, N310-13, N310-13GB Series Replacement Battery 6600mAh / 48.84Wh

305U1Z, N310, N310-13, N310-13GB Battery Specification

Voltage: 7.4V

Capacity: 6600mAh / 48.84Wh

Type: Li-ion

305U1Z, N310, N310-13, N310-13GB Fits Models

305U1Z, N310, N310-13, N310-13GB, N310-13GBK, N310-13GO, N310-KA03, N310-KA04, N310-KA05, N310-KA06, N310-KA07, N315, N315-JA01, N315-JA02, N315-JA04, N315-JA05, N315-JA06, NC310, NP100NZC, NP100NZC-A01RU, NP100NZC-A02RU, NP305U, NP305U1A, NP305U1Z, NP-N308, NP-N310, NP-N310-KA01NL, NP-N310-KA01UK, NP-N310-KA03, NP-N310-KA03PL, NP-N310-KA03UK, NP-N310-KA04, NP-N310-KA04ES, NP-N310-KA04UK, NP-N310-KA04US, NP-N310-KA04US/N310-13GB, NP-N310-KA05, NP-N310-KA05UK, NP-N310-KA05US, NP-N310-KA05US/N310-13GBK, NP-N310-KA06ES, NP-N310-KA06US, NP-N310-KA06US/N310-13GO, NP-N310-KA07US, NP-N310-KAO1FR, NP-N315, NP-N315-JA01AT, NP-N315-JA01GR, NP-N315-JA01NL, NP-N315-JA01SE, NP-N315-JA01US, NP-N315-JA02GR, NP-N315-JA04, NP-N315-JA05, NP-N315-JA06, NP-N315-JAS2BR, NP-NC310, NP-NF210, NP-NF310, NP-X118, NP-X118-DA01, NP-X118-DA04, NP-X118-DA07, NP-X120, NP-X120-FA01, NP-X120-FA02, NP-X120-FA03, NP-X120-FA03UK, NP-X120-JA01, NP-X120-JA01UK, NP-X120-JA02, NP-X120-JA02UK, NP-X120-JA03, NP-X120-PA01, NP-X120-PA01UK, NP-X170, NT305U, NT305U1A, NT305U1Z, NT-N310, NT-N315, NT-NC310, NT-X118, NT-X120, NT-X170, NT-X170-AA11B, NT-X170-AA21S, NT-X170-AA31B, NT-X170-BABIB, NT-X170-BABIP, NT-X170-PA40SE, NT-X170-PA52S, NT-X170-PA53P, NT-X170-PA53Y, NT-X170-PAK5BB, NT-X170-PINK, X118, X118-DA01, X118-DA02, X118-DA04, X118-DA07, X118-DA0J, X120, X120-FA01, X120-FA02, X120-FA03, X120-JA01, X120-JA01UK, X120-JA01ZA, X120-JA02, X120-JA03, X120-PA01, X170

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Samsung 305U1Z, N310, N310-13, N310-13GB Series Replacement Battery 6600mAh / 48.84Wh first appeared on Batterytek USA.