ATYS Moniteur Systolique Systoe Series Replacement Battery 2000mAh / 7.20Wh

ATYS Moniteur Systolique Systoe Series Replacement Battery 2000mAh / 7.20Wh

Moniteur Systolique Systoe Battery Specification

Voltage: 3.6V

Capacity: 2000mAh / 7.20Wh

Type: Ni-MH

Moniteur Systolique Systoe Fits Models

Moniteur Systolique Systoe

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post ATYS Moniteur Systolique Systoe Series Replacement Battery 2000mAh / 7.20Wh first appeared on Batterytek USA.