Apple iPOD Touch 3rd 32GB Replacement Battery 800mAh

Apple iPOD Touch 3rd 32GB Replacement Battery 800mAh

Apple iPOD Touch 3rd 32GB Replacement Battery 800mAh Battery Specification

Voltage: 3.7V

Capacity: 800mAh

Type: Li-Polymer

Apple iPOD Touch 3rd 32GB Replacement Battery 800mAh Fits Models

iPOD Touch 3rd 32GB

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Apple iPOD Touch 3rd 32GB Replacement Battery 800mAh first appeared on Batterytek USA.