Amazon Kindle 4G Replacement Battery 750mAh/2.78Wh

Amazon Kindle 4G Replacement Battery 750mAh/2.78Wh

Amazon Kindle 4G Replacement Battery 750mAh/2.78Wh Battery Specification

Voltage: 3.7V

Capacity: 750mAh/2.78Wh

Type: Li-Polymer

Amazon Kindle 4G Replacement Battery 750mAh/2.78Wh Fits Models

Kindle 4G

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Amazon Kindle 4G Replacement Battery 750mAh/2.78Wh first appeared on Batterytek USA.