Jimmy JW31 Series Replacement Battery 2500mAh / 50.00Wh

Jimmy JW31 Series Replacement Battery 2500mAh / 50.00Wh

JW31 Battery Specification

Voltage: 20.0V

Capacity: 2500mAh / 50.00Wh

Type: Li-ion

JW31 Fits Models

JW31

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Jimmy JW31 Series Replacement Battery 2500mAh / 50.00Wh first appeared on Batterytek USA.