Ohmeda Suction Unit Series Replacement Battery 2000mAh / 14.40Wh

Ohmeda Suction Unit Series Replacement Battery 2000mAh / 14.40Wh

Suction Unit Battery Specification

Voltage: 7.2V

Capacity: 2000mAh / 14.40Wh

Type: Ni-MH

Suction Unit Fits Models

Suction Unit

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Ohmeda Suction Unit Series Replacement Battery 2000mAh / 14.40Wh first appeared on Batterytek USA.