Ohmeda 5120 Oxygen Monitor, 5420 Volume Monitor, See Datek, Series Replacement Battery 3600mAh / 17.28Wh

Ohmeda 5120 Oxygen Monitor, 5420 Volume Monitor, See Datek, Series Replacement Battery 3600mAh / 17.28Wh

5120 Oxygen Monitor, 5420 Volume Monitor, See Datek, Battery Specification

Voltage: 4.8V

Capacity: 3600mAh / 17.28Wh

Type: Ni-MH

5120 Oxygen Monitor, 5420 Volume Monitor, See Datek, Fits Models

5120 Oxygen Monitor, 5420 Volume Monitor, See Datek

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Ohmeda 5120 Oxygen Monitor, 5420 Volume Monitor, See Datek, Series Replacement Battery 3600mAh / 17.28Wh first appeared on Batterytek USA.