Critikon 200, 300 Monitor, 400 Monitor, 400 Pro Dinamap BP Series Replacement Battery 2300mAh / 27.60Wh

Critikon 200, 300 Monitor, 400 Monitor, 400 Pro Dinamap BP Series Replacement Battery 2300mAh / 27.60Wh

200, 300 Monitor, 400 Monitor, 400 Pro Dinamap BP Battery Specification

Voltage: 12.0V

Capacity: 2300mAh / 27.60Wh

Type: Sealed Lead Acid

200, 300 Monitor, 400 Monitor, 400 Pro Dinamap BP Fits Models

200, 300 Monitor, 400 Monitor, 400 Pro Dinamap BP, 8700, 8700T Monitor, 8710, 8720, 8720 Monitor, 8725, 9700, 9700 Monitor, 9710, 9710 Dinamap Plus (Requires 2/, 9720 Dinamap Plus Monitor, Compact TS Monitor, Dinamap Compact, Monitor, Pro 100, TS, VSM

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post Critikon 200, 300 Monitor, 400 Monitor, 400 Pro Dinamap BP Series Replacement Battery 2300mAh / 27.60Wh first appeared on Batterytek USA.