AirSep Freestyle 3, Freestyle 5, Freestyle Portable Oxygen Conc, Series Replacement Battery 3600mAh / 53.28Wh

AirSep Freestyle 3, Freestyle 5, Freestyle Portable Oxygen Conc, Series Replacement Battery 3600mAh / 53.28Wh

Freestyle 3, Freestyle 5, Freestyle Portable Oxygen Conc, Battery Specification

Voltage: 14.8V

Capacity: 3600mAh / 53.28Wh

Type: Li-ion

Freestyle 3, Freestyle 5, Freestyle Portable Oxygen Conc, Fits Models

Freestyle 3, Freestyle 5, Freestyle Portable Oxygen Conc

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post AirSep Freestyle 3, Freestyle 5, Freestyle Portable Oxygen Conc, Series Replacement Battery 3600mAh / 53.28Wh first appeared on Batterytek USA.