ATOMOS Ninja 10-bit DTE field recorde Series Replacement Battery 2600mAh / 19.24Wh

ATOMOS Ninja 10-bit DTE field recorde Series Replacement Battery 2600mAh / 19.24Wh

Ninja 10-bit DTE field recorde Battery Specification

Voltage: 7.4V

Capacity: 2600mAh / 19.24Wh

Type: Li-ion

Ninja 10-bit DTE field recorde Fits Models

Ninja 10-bit DTE field recorde

Why shop with Batterytekusa?

– Latest retailer of replacement device batteries and accessories
– Shipping USA wide to all states and territories..
– Secure shopping online 24/7.
– If you’re unable to find a battery or not sure on fitment feel free to contact us for more info.
– 12 Months Batterytekusa warranty on every item sold.

The post ATOMOS Ninja 10-bit DTE field recorde Series Replacement Battery 2600mAh / 19.24Wh first appeared on Batterytek USA.